Fetus, natagpuan sa kisame ng hotel sa QC

Isang tinatayang 7-8 buwang fetus ang natagpuan sa kisame ng isang hotel sa Quezon City.

Natuklasan ito ng mga staff na naglilinis dahil sa masamang amoy.

Ang fetus ay nasa loob ng styrofoam cooler.

Iniimbestigahan na ng CIDU ang insidente at nakikipag-ugnayan sa hotel para sa CCTV footage.

Hindi pa tukoy ang nag-iwan ng fetus.